AlAs110+1.0

z<0.00002 0.00002<z<0.00032 0.00032<z<0.00061 0.00061<z<0.00091 0.00091<z<0.00121 0.00121<z<0.00151 0.00151<z<0.00180 0.00180<z<0.00210 z>0.00210